Copyright: Made with EasyHelp/Web (www.easyhelp.com)


DSD 1.14 Software Update

Eurotherm Drives USA

===============> DSD 1.14 Software Update <===============

To receive the latest version of DSD 1.14 and

the Link Database, download and install the

"ConfigEd and Link Database Update" files from

this Website. This will update the Link Database.

Then modem into the Manager Server to receive DSD.

======================================================

DSD 1.14 and the associated Database was released on 12 February 2003

======================================================

For questions, contact Eurotherm Drives USA,

Product Support Group, Monday-Friday / 8AM-5PM EST

at 704-588-3246.