Copyright: Made with EasyHelp/Web (www.easyhelp.com)


ConfigEd Lite 5.12
ConfigEd Lite 6.07

To download the latest version of ConfigEd Lite, download the 3 files:

1.	ConfigEd Lite Diskette #1

2.	ConfigEd Lite Diskette #2

3.	ConfigEd Lite Diskette #3

4.	The 3 downloaded files; celite1.exe, celite2.exe celite3.exe are self-extracting zip files. 3 floppy disks are required to install this program.

DO NOT COPY THESE FILES TO A FLOPPY DISK, AS THEY WILL NOT FIT. THE FILES HAVE TO BE UNZIPPED BEFORE THEY CAN BE PLACED ON A FLOPPY DISK.

5.	Insert a floppy disk in to the computer floppy disk drive. Click on the file celite1.exe. A program window will appear.

6.	In the window: Unzip to folder, enter A:

7.	Then click on Unzip. The files will transfer to the floppy disk.

8.	Repeat steps 4 to 7 for the file celite2.exe and celite3.exe

9.	Run setup.exe on the 1st floppy disk to install CELite 6.06

ConfigEd Lite 6.07 was released on 5 January 2005

For questions, contact Eurotherm Drives USA, Product Support Group,

Monday Friday / 8AM-5PM EST at 704-588-3246