Copyright: Made with EasyHelp/Web (www.easyhelp.com)


CELite+

The latest version of ConfigEd Lite Plus is a self installing program.

Note: CELite+ is an 11 Meg file.

1.	Download CELite+ by double clicking the hotlink.

2.	Click on "CELite+.exe" to install the program.

CELite+ version 3.0.60 was released on August 20, 2004

For more information, contact Eurotherm Drives USA, Product Support Group,

Monday - Friday / 8AM-5PM EST at 704-588-3246