Copyright: Made with EasyHelp/Web (www.easyhelp.com)


ConfigEd Lite 5.17 - CD ROM version
ConfigEd Lite 6.07 - CD ROM version

Note: "CELite"  is an 8.6 Meg file.

1.	Download CELite.exe  by double clicking the hotlink.

2.	Copy CELite.exe to a CD ROM or to the local hard drive.

3.	Run CELite.exe  to install the program.

ConfigEd Lite 6.07 was released on 5 January 2005

For questions, contact Eurotherm Drives USA, Product Support Group,

Monday Friday / 8AM-5PM EST at 704-588-3246