Copyright: Created with EasyHelp (Tel: 0973 209667)


SignalP/Special Switch 2 - RG354776

Description

This block selects between two inputs (top input is Input 1, middle input is Input 2, Select displays a 1 or a 2 to indicate which input is selected).  It has a single output. This switch functions as a memory. It saves the last inputs received at inputs 1 and 2 but sends the selected output only once when the selection is set. (The selection does not have to change, however.)

The switch does not send an initial output on startup. If that is desired an initializer should be connected to the select input.

Input 1 and Input 2 are persistent.

Parameters

Input 1	Input 1 to the block.  Expects a value (-100% to +100%).

Input 2	Input 2 to the block.  Expects a value (-100% to +100%).

Select	Select input to the block.  Expects Input 1 (false) or Input 2 (true). Trigger input.

Get Input 1	Returns the current value of input 1:  -100% to +100%.

Get Input 2	Returns the current value of input 2:  -100% to +100%.

Get Select	Returns the current state of the switch:  Input 1 (false) or Input 2 (true).


Description

This block selects between two inputs (top input is Input 1, middle input is Input 2, Select displays a 1 or a 2 to indicate which input is selected).  It has a single output. This switch functions as a memory. It saves the last inputs received at inputs 1 and 2 but sends the selected output only once when the selection is set. (The selection does not have to change, however.)

The switch does not send an initial output on startup. If that is desired an initializer should be connected to the select input.

Input 1 and Input 2 are persistent.


Parameters

Input 1	Input 1 to the block.  Expects a value (-100% to +100%).

Input 2	Input 2 to the block.  Expects a value (-100% to +100%).

Select	Select input to the block.  Expects Input 1 (false) or Input 2 (true). Trigger input.

Get Input 1	Returns the current value of input 1:  -100% to +100%.

Get Input 2	Returns the current value of input 2:  -100% to +100%.

Get Select	Returns the current state of the switch:  Input 1 (false) or Input 2 (true).