Copyright: Created with EasyHelp (Tel: 0973 209667)


Winders/CPW - RG354465

Description

This function block implements a Current Programmed Winder.  It is intended to perform the current limit calculations and associated logic for an open loop winder.

Please refer to the Winders/CPW manual for more details.

Parameters

Base Speed	Current Demand input.  Expects a value between -100% and 100%.

Boost	Tension Demand input. Expects a value between -100% and 100%.

Boost Enable	Tension Demand input.  Expects Proportional (true) or Fixed (false).

Boost Select	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Build Up	General Input.	Expects a value between 1 and 20.

Core 1	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Core 2	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Core Select	Diameter Calc. input.  Expects Core 2 (true) or Core 1 (false).

Dancer Cal	Tension Demand input.  Expects a value between -100% and 100%.

Derivative Cal	Current Demand input.  Expects a value between -100% and 100%.

Derivative SP	Current Demand input.  Expects a value between -120% and 120%.

Derivative	Current Demand input.  Expects a value between -1.0 and 1.0.

Diameter Filter	Diameter Calc. input.  Expects a value between 0 and 1.0.

Diameter Hold	Diameter Calc. input.  Expects Hold (true) or Track (false).

Dynamic Comp	Current Demand input.  Expects a value between -100% and 100%.

Ext Dia Select	Diameter Calc. input.  Expects External (true) or Core (false).

Ext Diameter	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Fixed Inertia	Current Demand input.  Expects a value between -100% and 100%.

Forward-Reverse	Diameter Calc. input.  Expects Forward (true) or Reverse (false).

Jog	Speed Demand input.  Expects Enabled (true) or Disabled (false).

Jog Speed	Speed Demand input.  Expects a value between -120% and 120%.

Line Speed	Diameter Calc. input.  Expects a value between -120% and 120%.

Line Speed SP	Speed Demand input.  Expects a value between -120% and 120%.

Min Diameter	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Min Speed	Diameter Calc. input.  Expects a value between -120% and 120%.

Other Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Over-Under	Tension Demand input.  Expects Over (true) or Under (false).

Overspeed	Speed Demand input.  Expects a value between -120% and 120%.

Preset Enable	Diameter Calc. input.  Expects Enabled (true) or Disabled (false).

Rewind-Unwind	Tension Demand input.  Expects Rewind (true) or Unwind (false).

Run Delta	Speed Demand input.  Expects a value between 0 and 100%.

Stall Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Stall Select	Tension Demand input.  Expects Proportional (true) or Fixed (false).

Stall Tension	Tension Demand input.  Expects a value between -100% and 100%.

Start	Speed Demand input.  Expects Enabled (true) or Disabled (false).

Stop Delta	Speed Demand input.  Expects a value between 0 and 100%.

Taper SP	Tension Demand input.  Expects a value between -100% and 100%.

Taper Select	Tension Demand input.  Expects Hyperbolic (true) or Linear (false).

Tension Cal	Current Demand input.  Expects a value between -100% and 100%.

Tension Delta	Tension Demand input.  Expects a value between 0 and 1.0.

Tension Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Tension SP	Tension Demand input.  Expects a value between -100% and 100%.

Tension Scale	Current Demand input.  Expects a value between -100% and 100%.

Tension Trim	Current Demand input.  Expects a value between -200% and 200%.

UTS Threshold	Up to Speed input.  Expects a value between -120% and 120%.

Variable Inertia	Current Demand input.  Expects a value between -100% and 100%.

WB Threshold	Diameter Calc. input.  Expects a value between 0 and 100%.

WB Reset	Diameter Calc. input.  Expects Enabled (true) or Disabled (false).

Width	Current Demand input.  Expects a value between -100% and 100%.

Winder Speed	General input.  Expects a value between -120% and 120%.

Get Base Speed	Returns the current state:  Value between -100% and 100%.

Get Boost 	Returns the current state:  Value between -100% and 100%.

Get Boost Enable 	Returns the current state:  Enabled (true) or Disabled (false).

Get Boost Select	Returns the current state:  Proportional (true) or Fixed (false).

Get Build Up	Returns the current state:  Value between 1 and 20.

Get Core	Returns the current state:  % (Full Roll = 100%).

Get Core 1	Returns the current state:  % (Full Roll = 100%).

Get Core 2	Returns the current state:  % (Full Roll = 100%).

Get Core Select	Returns the current state:  Core 2 (true) or Core 1 (false).

Get Current Demand	Returns the current state:  Value between -200% and 200%.

Get Dancer Cal	Returns the current state:  Value between -100% and 100%.

Get Derivative Cal	Returns the current state:  Value between -100% and 100%.

Get Derivative SP	Returns the current state:  Value between -120% and 120%.

Get Diameter	Returns the current state:  % (Full Roll = 100%).

Get Diameter Filter	Returns the current state:  Value between -1.0 and 1.0.

Get Diameter Hold	Returns the current state:  Holding (true) or Tracking (false).

Get Diameter Preset	Returns the current state:  % (Full Roll = 100%).

Get Dynamic Comp	Returns the current state:  Value between -100% and 100%.

Get Ext Dia Select	Returns the current state:  Enabled (true) or Disabled (false).

Get Ext Diameter	Returns the current state:  % (Full Roll = 100%).

Get Fixed Inertia	Returns the current state:  Value between -100% and 100%.

Get Forward-Reverse	Returns the current state:  Forward (true) or Reverse (false).

Get Jog	Returns the current state:  Enabled (true) or Disabled (false).

Get Jog Speed	Returns the current state:  Value between -120% and 120%.

Get Line Speed	Returns the current state:  Value between -120% and 120%.

Get Line Speed SP	Returns the current state:  Value between -120% and 120%.

Get Min Diameter	Returns the current state:  % (Full Roll = 100%).

Get Min Speed	Returns the current state:  Value between -120% and 120%.

Get Other Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Over-Under	Returns the current state:  Over (true) or Under (false).

Get Overspeed	Returns the current state:  Value between -120% and 120%.

Get Preset Enable 	Returns the current state:  Enabled (true) or Disabled (false).

Get Ramped Speed	Returns the current state:  Value between -120% and 120%.

Get Rewind-Unwind	Returns the current state:  Rewind (true) or Unwind (false).

Get Run Delta	Returns the current state:  Value between 0% and 100%.

Get Speed Delta	Returns the current state:  Value between 0% and 100%.

Get Speed Demand	Returns the current state:  Value between -120% and 120%.

Get Stall Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Stall Select	Returns the current state:  Proportional (true) or Fixed (false).

Get Stall Tension	Returns the current state:  Value between -100% and 100%.

Get Start	Returns the current state:  Started (true) or Off (false).

Get Stop Delta	Returns the current state:  Value between 0% and 100%.

Get Taper SP	Returns the current state:  Value between -100% and 100%.

Get Taper Select	Returns the current state:  Hyperbolic (true) or Linear (false).

Get Tension Cal	Returns the current state:  Value between -100% and 100%.

Get Tension Delta	Returns the current state:  Value between -100% and 100%.

Get Tension Demand	Returns the current state:  Value between -100% and 100%

Get Tension Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Tension Scale	Returns the current state:  Value between -100% and 100%.

Get Tension SP	Returns the current state:  Value between -100% and 100%.

Get Tension Trim	Returns the current state:  Value between -200% and 200%.

Get UTS Threshold	Returns the current state:  Value between -120% and 120%.

Get Up to Speed	Returns the current state:  true or false.

Get Variable Inertia	Returns the current state:  Value between -100% and 100%.

Get WB Threshold	Returns the current state:  Value between 0% and 100%.

Get WB Reset	Returns the current state:  Enabled (true) or Disabled (false).

Get Web Break	Returns the current state:  Enabled (true) or Disabled (false).

Get Width	Returns the current state:  Value between -100% and 100%.

Get Winder Speed	Returns the current state:  Value between -100% and 100%.


Description

This function block implements a Current Programmed Winder.  It is intended to perform the current limit calculations and associated logic for an open loop winder.

Please refer to the Winders/CPW manual for more details.


Parameters

Base Speed	Current Demand input.  Expects a value between -100% and 100%.

Boost	Tension Demand input. Expects a value between -100% and 100%.

Boost Enable	Tension Demand input.  Expects Proportional (true) or Fixed (false).

Boost Select	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Build Up	General Input.	Expects a value between 1 and 20.

Core 1	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Core 2	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Core Select	Diameter Calc. input.  Expects Core 2 (true) or Core 1 (false).

Dancer Cal	Tension Demand input.  Expects a value between -100% and 100%.

Derivative Cal	Current Demand input.  Expects a value between -100% and 100%.

Derivative SP	Current Demand input.  Expects a value between -120% and 120%.

Derivative	Current Demand input.  Expects a value between -1.0 and 1.0.

Diameter Filter	Diameter Calc. input.  Expects a value between 0 and 1.0.

Diameter Hold	Diameter Calc. input.  Expects Hold (true) or Track (false).

Dynamic Comp	Current Demand input.  Expects a value between -100% and 100%.

Ext Dia Select	Diameter Calc. input.  Expects External (true) or Core (false).

Ext Diameter	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Fixed Inertia	Current Demand input.  Expects a value between -100% and 100%.

Forward-Reverse	Diameter Calc. input.  Expects Forward (true) or Reverse (false).

Jog	Speed Demand input.  Expects Enabled (true) or Disabled (false).

Jog Speed	Speed Demand input.  Expects a value between -120% and 120%.

Line Speed	Diameter Calc. input.  Expects a value between -120% and 120%.

Line Speed SP	Speed Demand input.  Expects a value between -120% and 120%.

Min Diameter	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Min Speed	Diameter Calc. input.  Expects a value between -120% and 120%.

Other Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Over-Under	Tension Demand input.  Expects Over (true) or Under (false).

Overspeed	Speed Demand input.  Expects a value between -120% and 120%.

Preset Enable	Diameter Calc. input.  Expects Enabled (true) or Disabled (false).

Rewind-Unwind	Tension Demand input.  Expects Rewind (true) or Unwind (false).

Run Delta	Speed Demand input.  Expects a value between 0 and 100%.

Stall Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Stall Select	Tension Demand input.  Expects Proportional (true) or Fixed (false).

Stall Tension	Tension Demand input.  Expects a value between -100% and 100%.

Start	Speed Demand input.  Expects Enabled (true) or Disabled (false).

Stop Delta	Speed Demand input.  Expects a value between 0 and 100%.

Taper SP	Tension Demand input.  Expects a value between -100% and 100%.

Taper Select	Tension Demand input.  Expects Hyperbolic (true) or Linear (false).

Tension Cal	Current Demand input.  Expects a value between -100% and 100%.

Tension Delta	Tension Demand input.  Expects a value between 0 and 1.0.

Tension Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Tension SP	Tension Demand input.  Expects a value between -100% and 100%.

Tension Scale	Current Demand input.  Expects a value between -100% and 100%.

Tension Trim	Current Demand input.  Expects a value between -200% and 200%.

UTS Threshold	Up to Speed input.  Expects a value between -120% and 120%.

Variable Inertia	Current Demand input.  Expects a value between -100% and 100%.

WB Threshold	Diameter Calc. input.  Expects a value between 0 and 100%.

WB Reset	Diameter Calc. input.  Expects Enabled (true) or Disabled (false).

Width	Current Demand input.  Expects a value between -100% and 100%.

Winder Speed	General input.  Expects a value between -120% and 120%.

Get Base Speed	Returns the current state:  Value between -100% and 100%.

Get Boost 	Returns the current state:  Value between -100% and 100%.

Get Boost Enable 	Returns the current state:  Enabled (true) or Disabled (false).

Get Boost Select	Returns the current state:  Proportional (true) or Fixed (false).

Get Build Up	Returns the current state:  Value between 1 and 20.

Get Core	Returns the current state:  % (Full Roll = 100%).

Get Core 1	Returns the current state:  % (Full Roll = 100%).

Get Core 2	Returns the current state:  % (Full Roll = 100%).

Get Core Select	Returns the current state:  Core 2 (true) or Core 1 (false).

Get Current Demand	Returns the current state:  Value between -200% and 200%.

Get Dancer Cal	Returns the current state:  Value between -100% and 100%.

Get Derivative Cal	Returns the current state:  Value between -100% and 100%.

Get Derivative SP	Returns the current state:  Value between -120% and 120%.

Get Diameter	Returns the current state:  % (Full Roll = 100%).

Get Diameter Filter	Returns the current state:  Value between -1.0 and 1.0.

Get Diameter Hold	Returns the current state:  Holding (true) or Tracking (false).

Get Diameter Preset	Returns the current state:  % (Full Roll = 100%).

Get Dynamic Comp	Returns the current state:  Value between -100% and 100%.

Get Ext Dia Select	Returns the current state:  Enabled (true) or Disabled (false).

Get Ext Diameter	Returns the current state:  % (Full Roll = 100%).

Get Fixed Inertia	Returns the current state:  Value between -100% and 100%.

Get Forward-Reverse	Returns the current state:  Forward (true) or Reverse (false).

Get Jog	Returns the current state:  Enabled (true) or Disabled (false).

Get Jog Speed	Returns the current state:  Value between -120% and 120%.

Get Line Speed	Returns the current state:  Value between -120% and 120%.

Get Line Speed SP	Returns the current state:  Value between -120% and 120%.

Get Min Diameter	Returns the current state:  % (Full Roll = 100%).

Get Min Speed	Returns the current state:  Value between -120% and 120%.

Get Other Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Over-Under	Returns the current state:  Over (true) or Under (false).

Get Overspeed	Returns the current state:  Value between -120% and 120%.

Get Preset Enable 	Returns the current state:  Enabled (true) or Disabled (false).

Get Ramped Speed	Returns the current state:  Value between -120% and 120%.

Get Rewind-Unwind	Returns the current state:  Rewind (true) or Unwind (false).

Get Run Delta	Returns the current state:  Value between 0% and 100%.

Get Speed Delta	Returns the current state:  Value between 0% and 100%.

Get Speed Demand	Returns the current state:  Value between -120% and 120%.

Get Stall Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Stall Select	Returns the current state:  Proportional (true) or Fixed (false).

Get Stall Tension	Returns the current state:  Value between -100% and 100%.

Get Start	Returns the current state:  Started (true) or Off (false).

Get Stop Delta	Returns the current state:  Value between 0% and 100%.

Get Taper SP	Returns the current state:  Value between -100% and 100%.

Get Taper Select	Returns the current state:  Hyperbolic (true) or Linear (false).

Get Tension Cal	Returns the current state:  Value between -100% and 100%.

Get Tension Delta	Returns the current state:  Value between -100% and 100%.

Get Tension Demand	Returns the current state:  Value between -100% and 100%

Get Tension Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Tension Scale	Returns the current state:  Value between -100% and 100%.

Get Tension SP	Returns the current state:  Value between -100% and 100%.

Get Tension Trim	Returns the current state:  Value between -200% and 200%.

Get UTS Threshold	Returns the current state:  Value between -120% and 120%.

Get Up to Speed	Returns the current state:  true or false.

Get Variable Inertia	Returns the current state:  Value between -100% and 100%.

Get WB Threshold	Returns the current state:  Value between 0% and 100%.

Get WB Reset	Returns the current state:  Enabled (true) or Disabled (false).

Get Web Break	Returns the current state:  Enabled (true) or Disabled (false).

Get Width	Returns the current state:  Value between -100% and 100%.

Get Winder Speed	Returns the current state:  Value between -100% and 100%.