Copyright: Created with EasyHelp (Tel: 0973 209667)


Winders/SPW - RG354464

Description

This function block implements a Speed Programmed Winder.  It is intended to perform the speed demand calculations and associated logic for a closed loop winder.

Please refer to the Winders/SPW manual for more details.

Parameters

Armature Current	Current Memory input.  Expects a value between -200% and 200%.

Boost	Tension Demand input.  Expects a value between -100% and 100%.

Boost Enable	Tension Demand input.  Expects Enabled (true) or Fixed (false).

Boost Select	Tension Demand input.  Expects Proportional (true) or Fixed (false).

Build Up	General Input. Expects a value between 1 and 20.

CM Boost	Current Memory input.  Expects Proportional (true) or Fixed (false).

CM Boost Select	Current Memory input.  Expects a value between -100% and 100%.

Core 1	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Core 2	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Core Select	Diameter Calc. input.  Expects Core 2 (true) or Core 1 (false).

D Exponent	Speed Demand input.  Expects an ordinal between 1 and 10.

D Max Gain	Speed Demand input.  Expects a value between -5 and 5.

D Min Gain	Speed Demand input.  Expects a value 0 to 100% (of Max Gain).

Dancer Cal	Tension Demand input.  Expects a value between -100% and 100%.

Diameter Filter	Diameter Calc. input.  Expects a value between 0 and 1.0.

Diameter Hold	Diameter Calc. input.  Expects Hold (true) or Track (false).

Drive Exponent	Speed Demand input.  Expects an ordinal between 1 and 10.

Drive Max Gain	Speed Demand input.  Expects a value between 0 and 200.

Drive Min Gain	Speed Demand input.  Expects a value 0 to 100% (of Max Gain).

Ext Dia Select	Diameter Calc. input.  Expects External (true) or Core (false).

Ext Diameter	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Extensible Web	Speed Demand input.  Expects Enabled (true) or Disabled (false).

Feedback	Speed Demand input.  Expects a value between -100% and 100%.

Forward-Reverse	Diameter Calc. input.  Expects Forward (true) or Reverse (false).

Jog	Speed Demand input.  Expects Enabled (true) or Disabled (false).

Jog Speed	Speed Demand input.  Expects a value between -120% and 120%.

LC 1 Sign	Speed Demand input.  Expects a value between -100% and 100%.

LC 2 Sign	Speed Demand input.  Expects a value between -100% and 100%.

LC 1 Zero	Speed Demand input.  Expects a value between -100% and 100%.

LC 2 Zero	Speed Demand input.  Expects a value between -100% and 100%.

LC Span	Speed Demand input.  Expects a value between -10 and 10.

Line Speed	Diameter Calc. input.  Expects a value between -120% and 120%.

Line Speed SP	Speed Demand input.  Expects a value between -120% and 120%.

Loadcell 1	Speed Demand input.  Expects a value between -100% and 100%.

Loadcell 2	Speed Demand input.  Expects a value between -100% and 100%.

Memory Enable	Current Memory input.  Expects Enabled (true) or Disabled (false).

Memory Filter	Current Memory input.  Expects a value between 0 and 1.0.

Memory Hold	Current Memory input.  Expects Hold (true) or Track (false).

Min Diameter	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Min Speed	Diameter Calc. input.  Expects a value between -120% and 120%.

Other Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Over-Under	Tension Demand input.  Expects Over (true) or Under (false).

P Exponent	Speed Demand input.  Expects an ordinal between 1 and 10.

P Max Gain	Speed Demand input.  Expects a value between -30 and 30.

P Min Gain	Speed Demand input.  Expects a value 0 to 100% (of Max Gain).

Preset Enable	Diameter Calc. input.  Expects Enabled (true) or Disabled (false).

Range Extn	Speed Demand input.  Expects a value between -100% and 100%.

Range Non-Extn	Speed Demand input.  Expects a value between -100% and 100%.

Rewind-Unwind	Tension Demand input.  Expects Rewind (true) or Unwind (false).

Run Delta	Speed Demand input.  Expects a value between 0 and 100%.

Stall Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Stall Select	Tension Demand input.  Expects Proportional (true) or Fixed (false).

Stall Tension	Tension Demand input.  Expects a value between -100% and 100%.

Start	Speed Demand input.  Expects Enabled (true) or Disabled (false).

Stop Delta	Speed Demand input.  Expects a value between 0 and 100%.

Taper SP	Tension Demand input.  Expects a value between -100% and 100%.

Taper Select	Tension Demand input.  Expects Hyperbolic (true) or Linear (false).

Tension Delta	Tension Demand input.  Expects a value between 0 and 1.0.

Tension Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Tension SP	Tension Demand input.  Expects a value between -100% and 100%.

UTS Threshold	Up to Speed input.  Expects a value between -120% and 120%.

WB Threshold	Diameter Calc. input.  Expects a value between 0 and 100%.

WB Reset	Diameter Calc. input.  Expects Enabled (true) or Disabled (false).

Winder Speed	General input.  Expects a value between -120% and 120%.

Get Boost	Returns the current state:  Value between -100% and 100%.

Get Boost Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Boost Select	Returns the current state:  Proportional (true) or Fixed (false).

Get Build Up	Returns the current state:  Value between 1 and 20.

Get CM Boost	Returns the current state:  Value between -100% and 100%.

Get CM Boost Select	Returns the current state:  Proportional (true) or Fixed (false).

Get Core	Returns the current state:  % (Full Roll = 100%).

Get Core 1	Returns the current state:  % (Full Roll = 100%).

Get Core 2	Returns the current state:  % (Full Roll = 100%).

Get Core Select	Returns the current state:  Core 2 (true) or Core 1 (false).

Get Current Demand	Returns the current state:  Value between -200% and 200%.

Get D Exponent	Returns the current state:  Ordinal 1 to 10.

Get D Max Gain	Returns the current state:  Value between 0% and 100%.

Get D Min Gain	Returns the current state:  % of Max Gain.

Get Dancer Cal	Returns the current state:  Value between -100% and 100%.

Get Diameter	Returns the current state:  % (Full Roll = 100%).

Get Diameter Filter	Returns the current state:  Value between -1.0 and 1.0.

Get Diameter Hold	Returns the current state:  Holding (true) or Tracking (false).

Get Diameter Preset	Returns the current state:  % (Full Roll = 100%).

Get Drive Exponent	Returns the current state:  Ordinal 1 to 10.

Get Drive Max Gain	Returns the current state:  Value between 0 and 200.

Get Drive Min Gain	Returns the current state:  % of Max Gain.

Get Drive P Gain	Returns the current state:  Value between 0 and 200.

Get Ext Dia Select	Returns the current state:  Enabled (true) or Disabled (false).

Get Ext Diameter	Returns the current state:  % (Full Roll = 100%).

Get Extensible Web	Returns the current state:  Enabled (true) or Disabled (false).

Get Feedback	Returns the current state:  Value between -100% and 100%.

Get Filtered Current	Returns the current state:  Value between -200% and 200%.

Get Forward-Reverse	Returns the current state:  Forward (true) or Reverse (false).

Get Jog	Returns the current state:  Enabled (true) or Disabled (false).

Get Jog Speed	Returns the current state:  Value between -120% and 120%.

Get LC 1 Sign 	Returns the current state:  Value between -100% and 100%.

Get LC 2 Sign	Returns the current state:  Value between -100% and 100%.

Get LC 1 Zero	Returns the current state:  Value between -100% and 100%.

Get LC 2 Zero	Returns the current state:  Value between -100% and 100%.

Get LC Span	Returns the current state:  Value between -10 and 10.

Get Line Speed	Returns the current state:  Value between -120% and 120%.

Get Line Speed SP	Returns the current state:  Value between -120% and 120%.

Get Loadcell 1	Returns the current state:  Value between -100% and 100%.

Get Loadcell 2	Returns the current state:  Value between -100% and 100%.

Get Memory Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Memory Filter	Returns the current state:  Value between 0 and 1.0.

Get Memory Hold	Returns the current state:  Holding (true) or Tracking (false).

Get Min Diameter	Returns the current state:  % (Full Roll = 100%).

Get Min Speed	Returns the current state:  Value between -120% and 120%.

Get Other Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Over-Under	Returns the current state:  Over (true) or Under (false).

Get P Exponent	Returns the current state:  Ordinal 1 to 10.

Get P Max Gain	Returns the current state:  Value between 0% and 100%.

Get P Min Gain	Returns the current state:  % of Max Gain.

Get Preset Enable 	Returns the current state:  Enabled (true) or Disabled (false).

Get Ramped Speed	Returns the current state:  Value between -120% and 120%.

Get Range	Returns the current state:  Value between -100% and 100%.

Get Range Extn	Returns the current state:  Value between -100% and 100%.

Get Range Extn	Returns the current state:  Value between -100% and 100%.

Get Range Non-Extn	Returns the current state:  Value between -100% and 100%.

Get Rewind-Unwind	Returns the current state:  Rewind (true) or Unwind (false).

Get Run Delta	Returns the current state:  Value between 0% and 100%.

Get Speed Delta	Returns the current state:  Value between 0% and 100%.

Get Speed Demand	Returns the current state:  Value between -120% and 120%.

Get Stall Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Stall Select	Returns the current state:  Proportional (true) or fixed (false).

Get Stall Tension	Returns the current state:  Value between -100% and 100%.

Get Start	Returns the current state:  Started (true) or Off (false).

Get Stop Delta	Returns the current state:  Value between 0% and 100%.

Get Taper SP	Returns the current state:  Value between -100% and 100%.

Get Taper Select	Returns the current state:  Hyperbolic (true) or Linear (false).

Get Tension Delta	Returns the current state:  Value between -100% and 100%.

Get Tension Demand	Returns the current state:  Value between -100% and 100%.

Get Tension Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Tension SP	Returns the current state:  Value between -100% and 100%.

Get UTS Threshold	Returns the current state:  Value between -120% and 120%.

Get Up to Speed	Returns the current state:  true or false.

Get WB Threshold	Returns the current state:  Value between 0% and 100%.

Get WB Reset	Returns the current state:  Enabled (true) or Disabled (false).

Get Web Break	Returns the current state:  Enabled (true) or Disabled (false).

Get Winder Speed	Returns the current state:  Value between -120% and 120%.


Description

This function block implements a Speed Programmed Winder.  It is intended to perform the speed demand calculations and associated logic for a closed loop winder.

Please refer to the Winders/SPW manual for more details.


Parameters

Armature Current	Current Memory input.  Expects a value between -200% and 200%.

Boost	Tension Demand input.  Expects a value between -100% and 100%.

Boost Enable	Tension Demand input.  Expects Enabled (true) or Fixed (false).

Boost Select	Tension Demand input.  Expects Proportional (true) or Fixed (false).

Build Up	General Input. Expects a value between 1 and 20.

CM Boost	Current Memory input.  Expects Proportional (true) or Fixed (false).

CM Boost Select	Current Memory input.  Expects a value between -100% and 100%.

Core 1	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Core 2	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Core Select	Diameter Calc. input.  Expects Core 2 (true) or Core 1 (false).

D Exponent	Speed Demand input.  Expects an ordinal between 1 and 10.

D Max Gain	Speed Demand input.  Expects a value between -5 and 5.

D Min Gain	Speed Demand input.  Expects a value 0 to 100% (of Max Gain).

Dancer Cal	Tension Demand input.  Expects a value between -100% and 100%.

Diameter Filter	Diameter Calc. input.  Expects a value between 0 and 1.0.

Diameter Hold	Diameter Calc. input.  Expects Hold (true) or Track (false).

Drive Exponent	Speed Demand input.  Expects an ordinal between 1 and 10.

Drive Max Gain	Speed Demand input.  Expects a value between 0 and 200.

Drive Min Gain	Speed Demand input.  Expects a value 0 to 100% (of Max Gain).

Ext Dia Select	Diameter Calc. input.  Expects External (true) or Core (false).

Ext Diameter	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Extensible Web	Speed Demand input.  Expects Enabled (true) or Disabled (false).

Feedback	Speed Demand input.  Expects a value between -100% and 100%.

Forward-Reverse	Diameter Calc. input.  Expects Forward (true) or Reverse (false).

Jog	Speed Demand input.  Expects Enabled (true) or Disabled (false).

Jog Speed	Speed Demand input.  Expects a value between -120% and 120%.

LC 1 Sign	Speed Demand input.  Expects a value between -100% and 100%.

LC 2 Sign	Speed Demand input.  Expects a value between -100% and 100%.

LC 1 Zero	Speed Demand input.  Expects a value between -100% and 100%.

LC 2 Zero	Speed Demand input.  Expects a value between -100% and 100%.

LC Span	Speed Demand input.  Expects a value between -10 and 10.

Line Speed	Diameter Calc. input.  Expects a value between -120% and 120%.

Line Speed SP	Speed Demand input.  Expects a value between -120% and 120%.

Loadcell 1	Speed Demand input.  Expects a value between -100% and 100%.

Loadcell 2	Speed Demand input.  Expects a value between -100% and 100%.

Memory Enable	Current Memory input.  Expects Enabled (true) or Disabled (false).

Memory Filter	Current Memory input.  Expects a value between 0 and 1.0.

Memory Hold	Current Memory input.  Expects Hold (true) or Track (false).

Min Diameter	Diameter Calc. input.  Expects a value 0.1% to 100% Full Roll.

Min Speed	Diameter Calc. input.  Expects a value between -120% and 120%.

Other Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Over-Under	Tension Demand input.  Expects Over (true) or Under (false).

P Exponent	Speed Demand input.  Expects an ordinal between 1 and 10.

P Max Gain	Speed Demand input.  Expects a value between -30 and 30.

P Min Gain	Speed Demand input.  Expects a value 0 to 100% (of Max Gain).

Preset Enable	Diameter Calc. input.  Expects Enabled (true) or Disabled (false).

Range Extn	Speed Demand input.  Expects a value between -100% and 100%.

Range Non-Extn	Speed Demand input.  Expects a value between -100% and 100%.

Rewind-Unwind	Tension Demand input.  Expects Rewind (true) or Unwind (false).

Run Delta	Speed Demand input.  Expects a value between 0 and 100%.

Stall Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Stall Select	Tension Demand input.  Expects Proportional (true) or Fixed (false).

Stall Tension	Tension Demand input.  Expects a value between -100% and 100%.

Start	Speed Demand input.  Expects Enabled (true) or Disabled (false).

Stop Delta	Speed Demand input.  Expects a value between 0 and 100%.

Taper SP	Tension Demand input.  Expects a value between -100% and 100%.

Taper Select	Tension Demand input.  Expects Hyperbolic (true) or Linear (false).

Tension Delta	Tension Demand input.  Expects a value between 0 and 1.0.

Tension Enable	Tension Demand input.  Expects Enabled (true) or Disabled (false).

Tension SP	Tension Demand input.  Expects a value between -100% and 100%.

UTS Threshold	Up to Speed input.  Expects a value between -120% and 120%.

WB Threshold	Diameter Calc. input.  Expects a value between 0 and 100%.

WB Reset	Diameter Calc. input.  Expects Enabled (true) or Disabled (false).

Winder Speed	General input.  Expects a value between -120% and 120%.

Get Boost	Returns the current state:  Value between -100% and 100%.

Get Boost Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Boost Select	Returns the current state:  Proportional (true) or Fixed (false).

Get Build Up	Returns the current state:  Value between 1 and 20.

Get CM Boost	Returns the current state:  Value between -100% and 100%.

Get CM Boost Select	Returns the current state:  Proportional (true) or Fixed (false).

Get Core	Returns the current state:  % (Full Roll = 100%).

Get Core 1	Returns the current state:  % (Full Roll = 100%).

Get Core 2	Returns the current state:  % (Full Roll = 100%).

Get Core Select	Returns the current state:  Core 2 (true) or Core 1 (false).

Get Current Demand	Returns the current state:  Value between -200% and 200%.

Get D Exponent	Returns the current state:  Ordinal 1 to 10.

Get D Max Gain	Returns the current state:  Value between 0% and 100%.

Get D Min Gain	Returns the current state:  % of Max Gain.

Get Dancer Cal	Returns the current state:  Value between -100% and 100%.

Get Diameter	Returns the current state:  % (Full Roll = 100%).

Get Diameter Filter	Returns the current state:  Value between -1.0 and 1.0.

Get Diameter Hold	Returns the current state:  Holding (true) or Tracking (false).

Get Diameter Preset	Returns the current state:  % (Full Roll = 100%).

Get Drive Exponent	Returns the current state:  Ordinal 1 to 10.

Get Drive Max Gain	Returns the current state:  Value between 0 and 200.

Get Drive Min Gain	Returns the current state:  % of Max Gain.

Get Drive P Gain	Returns the current state:  Value between 0 and 200.

Get Ext Dia Select	Returns the current state:  Enabled (true) or Disabled (false).

Get Ext Diameter	Returns the current state:  % (Full Roll = 100%).

Get Extensible Web	Returns the current state:  Enabled (true) or Disabled (false).

Get Feedback	Returns the current state:  Value between -100% and 100%.

Get Filtered Current	Returns the current state:  Value between -200% and 200%.

Get Forward-Reverse	Returns the current state:  Forward (true) or Reverse (false).

Get Jog	Returns the current state:  Enabled (true) or Disabled (false).

Get Jog Speed	Returns the current state:  Value between -120% and 120%.

Get LC 1 Sign 	Returns the current state:  Value between -100% and 100%.

Get LC 2 Sign	Returns the current state:  Value between -100% and 100%.

Get LC 1 Zero	Returns the current state:  Value between -100% and 100%.

Get LC 2 Zero	Returns the current state:  Value between -100% and 100%.

Get LC Span	Returns the current state:  Value between -10 and 10.

Get Line Speed	Returns the current state:  Value between -120% and 120%.

Get Line Speed SP	Returns the current state:  Value between -120% and 120%.

Get Loadcell 1	Returns the current state:  Value between -100% and 100%.

Get Loadcell 2	Returns the current state:  Value between -100% and 100%.

Get Memory Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Memory Filter	Returns the current state:  Value between 0 and 1.0.

Get Memory Hold	Returns the current state:  Holding (true) or Tracking (false).

Get Min Diameter	Returns the current state:  % (Full Roll = 100%).

Get Min Speed	Returns the current state:  Value between -120% and 120%.

Get Other Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Over-Under	Returns the current state:  Over (true) or Under (false).

Get P Exponent	Returns the current state:  Ordinal 1 to 10.

Get P Max Gain	Returns the current state:  Value between 0% and 100%.

Get P Min Gain	Returns the current state:  % of Max Gain.

Get Preset Enable 	Returns the current state:  Enabled (true) or Disabled (false).

Get Ramped Speed	Returns the current state:  Value between -120% and 120%.

Get Range	Returns the current state:  Value between -100% and 100%.

Get Range Extn	Returns the current state:  Value between -100% and 100%.

Get Range Extn	Returns the current state:  Value between -100% and 100%.

Get Range Non-Extn	Returns the current state:  Value between -100% and 100%.

Get Rewind-Unwind	Returns the current state:  Rewind (true) or Unwind (false).

Get Run Delta	Returns the current state:  Value between 0% and 100%.

Get Speed Delta	Returns the current state:  Value between 0% and 100%.

Get Speed Demand	Returns the current state:  Value between -120% and 120%.

Get Stall Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Stall Select	Returns the current state:  Proportional (true) or fixed (false).

Get Stall Tension	Returns the current state:  Value between -100% and 100%.

Get Start	Returns the current state:  Started (true) or Off (false).

Get Stop Delta	Returns the current state:  Value between 0% and 100%.

Get Taper SP	Returns the current state:  Value between -100% and 100%.

Get Taper Select	Returns the current state:  Hyperbolic (true) or Linear (false).

Get Tension Delta	Returns the current state:  Value between -100% and 100%.

Get Tension Demand	Returns the current state:  Value between -100% and 100%.

Get Tension Enable	Returns the current state:  Enabled (true) or Disabled (false).

Get Tension SP	Returns the current state:  Value between -100% and 100%.

Get UTS Threshold	Returns the current state:  Value between -120% and 120%.

Get Up to Speed	Returns the current state:  true or false.

Get WB Threshold	Returns the current state:  Value between 0% and 100%.

Get WB Reset	Returns the current state:  Enabled (true) or Disabled (false).

Get Web Break	Returns the current state:  Enabled (true) or Disabled (false).

Get Winder Speed	Returns the current state:  Value between -120% and 120%.