Copyright: Created with EasyHelp (Tel: 0973 209667)


Ordinal/Fan In Switch, Ord - RG354432

Description

This block Selects one of ten Inputs.  It provides a single Output.  All of the Inputs are persistent.

Parameters

Input 1	Input #1.  Expects an ordinal.

Input 2	Input #2.  Expects an ordinal.

Input 3	Input #3.  Expects an ordinal.

Input 4	Input #4.  Expects an ordinal.

Input 5	Input #5.  Expects an ordinal.

Input 6	Input #6.  Expects an ordinal.

Input 7	Input #7.  Expects an ordinal.

Input 8	Input #8.  Expects an ordinal.

Input 9	Input #9.  Expects an ordinal.

Input 10	Input #10.  Expects an ordinal.

Select	Select input.  Expects an ordinal (1 to 10).

Get Input 1	Returns the current value of input #1:  an ordinal.

Get Input 2	Returns the current value of input #2:  an ordinal.

Get Input 3	Returns the current value of input #3:  an ordinal.

Get Input 4	Returns the current value of input #4:  an ordinal.

Get Input 5	Returns the current value of input #5:  an ordinal.

Get Input 6	Returns the current value of input #6:  an ordinal.

Get Input 7	Returns the current value of input #7:  an ordinal.

Get Input 8	Returns the current value of input #8:  an ordinal.

Get Input 9	Returns the current value of input #9:  an ordinal.

Get Input 10	Returns the current value of input #10:  an ordinal.

Get Output	Returns the current value of the output:  an ordinal.

Get Select	Returns the current value of the Select input:  1 to 10.


Description

This block Selects one of ten Inputs.  It provides a single Output.  All of the Inputs are persistent.


Parameters

Input 1	Input #1.  Expects an ordinal.

Input 2	Input #2.  Expects an ordinal.

Input 3	Input #3.  Expects an ordinal.

Input 4	Input #4.  Expects an ordinal.

Input 5	Input #5.  Expects an ordinal.

Input 6	Input #6.  Expects an ordinal.

Input 7	Input #7.  Expects an ordinal.

Input 8	Input #8.  Expects an ordinal.

Input 9	Input #9.  Expects an ordinal.

Input 10	Input #10.  Expects an ordinal.

Select	Select input.  Expects an ordinal (1 to 10).

Get Input 1	Returns the current value of input #1:  an ordinal.

Get Input 2	Returns the current value of input #2:  an ordinal.

Get Input 3	Returns the current value of input #3:  an ordinal.

Get Input 4	Returns the current value of input #4:  an ordinal.

Get Input 5	Returns the current value of input #5:  an ordinal.

Get Input 6	Returns the current value of input #6:  an ordinal.

Get Input 7	Returns the current value of input #7:  an ordinal.

Get Input 8	Returns the current value of input #8:  an ordinal.

Get Input 9	Returns the current value of input #9:  an ordinal.

Get Input 10	Returns the current value of input #10:  an ordinal.

Get Output	Returns the current value of the output:  an ordinal.

Get Select	Returns the current value of the Select input:  1 to 10.