Copyright: Created with EasyHelp (Tel: 0973 209667)


Logic/Fan Out Switch, Lgc - RG354431

Description

This block connects a single Input to one of ten Selected Outputs.  All of the Outputs are persistent.

Parameters

Input	Input.  Expects false or true.

Get Output 1	Returns the current value of output #1:  false or true.

Get Output 2	Returns the current value of output #2:  false or true.

Get Output 3	Returns the current value of output #3:  false or true.

Get Output 4	Returns the current value of output #4:  false or true.

Get Output 5	Returns the current value of output #5:  false or true.

Get Output 6	Returns the current value of output #6:  false or true.

Get Output 7	Returns the current value of output #7:  false or true.

Get Output 8	Returns the current value of output #8:  false or true.

Get Output 9	Returns the current value of output #9:  false or true.

Get Output 10	Returns the current value of output #10:  false or true.

Get Input	Returns the current value of the input:  false or true.

Select	Select input.  Expects an ordinal (1 to 10).

Get Select	Returns the current value of the Select input:  1 to 10.


Description

This block connects a single Input to one of ten Selected Outputs.  All of the Outputs are persistent.


Parameters

Input	Input.  Expects false or true.

Get Output 1	Returns the current value of output #1:  false or true.

Get Output 2	Returns the current value of output #2:  false or true.

Get Output 3	Returns the current value of output #3:  false or true.

Get Output 4	Returns the current value of output #4:  false or true.

Get Output 5	Returns the current value of output #5:  false or true.

Get Output 6	Returns the current value of output #6:  false or true.

Get Output 7	Returns the current value of output #7:  false or true.

Get Output 8	Returns the current value of output #8:  false or true.

Get Output 9	Returns the current value of output #9:  false or true.

Get Output 10	Returns the current value of output #10:  false or true.

Get Input	Returns the current value of the input:  false or true.

Select	Select input.  Expects an ordinal (1 to 10).

Get Select	Returns the current value of the Select input:  1 to 10.