Copyright: Created with EasyHelp (Tel: 0973 209667)


SignalP/Fan Out Switch, Val - RG354429

Description

This block connects a single Input to one of ten Outputs.  All of the Outputs are persistent.

Parameters

Input	Input.  Expects a value (-100% to +100%).

Get Output 1	Returns the current value of output #1:  -100% to +100%.

Get Output 2	Returns the current value of output #2:  -100% to +100%.

Get Output 3	Returns the current value of output #3:  -100% to +100%.

Get Output 4	Returns the current value of output #4:  -100% to +100%.

Get Output 5	Returns the current value of output #5:  -100% to +100%.

Get Output 6	Returns the current value of output #6:  -100% to +100%.

Get Output 7	Returns the current value of output #7:  -100% to +100%.

Get Output 8	Returns the current value of output #8:  -100% to +100%.

Get Output 9	Returns the current value of output #9:  -100% to +100%.

Get Output 10	Returns the current value of output #10:  -100% to +100%.

Get Input	Returns the current value of the input:  -100% to +100%.

Select	Select input.  Expects an ordinal (1 to 10).

Get Select	Returns the current value of the Select input:  1 to 10.


Description

This block connects a single Input to one of ten Outputs.  All of the Outputs are persistent.


Parameters

Input	Input.  Expects a value (-100% to +100%).

Get Output 1	Returns the current value of output #1:  -100% to +100%.

Get Output 2	Returns the current value of output #2:  -100% to +100%.

Get Output 3	Returns the current value of output #3:  -100% to +100%.

Get Output 4	Returns the current value of output #4:  -100% to +100%.

Get Output 5	Returns the current value of output #5:  -100% to +100%.

Get Output 6	Returns the current value of output #6:  -100% to +100%.

Get Output 7	Returns the current value of output #7:  -100% to +100%.

Get Output 8	Returns the current value of output #8:  -100% to +100%.

Get Output 9	Returns the current value of output #9:  -100% to +100%.

Get Output 10	Returns the current value of output #10:  -100% to +100%.

Get Input	Returns the current value of the input:  -100% to +100%.

Select	Select input.  Expects an ordinal (1 to 10).

Get Select	Returns the current value of the Select input:  1 to 10.