Copyright: Created with EasyHelp (Tel: 0973 209667)


L5203 S/Analog Block - RG354383

Description

As per the Eurotherm Bisync specification, parameters are grouped into blocks of eight.  This function block serves as a container for the associations of Analog Parameters with their bisync blocks.

All Blocks require parameter 7 to be an ordinal which many Bisync supervisors consider to be 16 logics.  To emulate this behavior use Logic/Ordinal to Logics, Logic/Logics to Ordinal, or  L5203 S/Logics Helper function blocks in conjunction with the L5203 S/Ordinal Parameter function block..

The bisync block number associated with a particular Block function block is defined by the placement of the reference to this block in the Port. Analog Blocks may only be used in block numbers 8 through 15.  Please refer to data sheets for L5203 S/Port ASCII or L5203 S/Port Binary for more detailed information.

All parameter associations in this block must refer either to the L5203 S/Unused function block or a unique parameter function block of the appropriate type: L5203 S/Analog Parameter or L5203 S/Ordinal Parameter.  Please refer to their data sheets for more detailed information on configuring parameters.

Parameters

No operations may be performed on this function block.


Description

As per the Eurotherm Bisync specification, parameters are grouped into blocks of eight.  This function block serves as a container for the associations of Analog Parameters with their bisync blocks.

All Blocks require parameter 7 to be an ordinal which many Bisync supervisors consider to be 16 logics.  To emulate this behavior use Logic/Ordinal to Logics, Logic/Logics to Ordinal, or  L5203 S/Logics Helper function blocks in conjunction with the L5203 S/Ordinal Parameter function block..

The bisync block number associated with a particular Block function block is defined by the placement of the reference to this block in the Port. Analog Blocks may only be used in block numbers 8 through 15.  Please refer to data sheets for L5203 S/Port ASCII or L5203 S/Port Binary for more detailed information.

All parameter associations in this block must refer either to the L5203 S/Unused function block or a unique parameter function block of the appropriate type: L5203 S/Analog Parameter or L5203 S/Ordinal Parameter.  Please refer to their data sheets for more detailed information on configuring parameters.


Parameters

No operations may be performed on this function block.