Copyright: Created with EasyHelp (Tel: 0973 209667)


Data Sheets - RG352134

The SSD Link function block data sheets are grouped into the following categories:

All	List of all function blocks.

Alarms	Alarm handling functions.

Analog	Analog I/O channel functions.

DH+ Gateway	DH+ Gateway I/O functions.

Digital	Digital I/O channel functions.

FSM	FSM handling functions.

Function	General functions.

G Profiler	Profiling functions.

Generic Gwy	Generic Gateway functions for custom hardware.

L5203 S	EI Bisync Slave functions.

L5203 L	Serial Logger functions.

L5203 M	EI Bisync Master functions.

Line Drive	Line control functions.

Logic Block	Start Logic.

Logic Gate	Boolean logic functions expressed in gate form.

Logic	Logic handling functions.

L5210 MB+	Modbus plus handling functions.

OpStn	Opstation functions.

Ordinal	Ordinal handling functions.

Recipe	Recipe functions.

Sampler	Sampler functions.

Sender	Sender functions.

SignalP	Signal Processing functions.

Utility	Utility functions.

VME	VME functions.

Winders	Winder control functions.


All

Alarms/Alarm Channel	RG35402 5 - Single channel of an alarm-handling system.

Alarms/Alarm Handler	RG354026 - Implements an alarm handling system.

Analog/Analog Input	RG354271 - Analog Input channel for L5201 module.

Analog/Analog Output	RG354272 - Analog Output channel for L5201 module.

DH+ Gateway/Bit Input Register	RG354380 - Bit Input to SSD Link from Data Highway Plus.

DH+ Gateway/Bit Output Register	RG354381 - Bit Output from SSD Link to Data Highway Plus.

DH+ Gateway/Float Input Register	RG354459 - Float Input to SSD Link from Data Highway Plus.

DH+ Gateway/ Float Output Register	RG354460- Float Output from SSD Link to Data Highway Plus.

DH+ Gateway/Integer Input Register	RG354461 - Integer Input to SSD Link from Data Highway Plus.

DH+ Gateway/ Integer Output Register	RG354462 - Integer Output from SSD Link to Data Highway Plus.

Digital/Digital Handler	RG350758 - Specifies Digital Input/Output Channels for normal digital module (L5202).

Digital/Digital Handler2	RG354138 - Specifies Digital Input/Output Channels for high speed digital module (L5209)..

Digital/Input Channel	RG350759 - Handles one Digital Input to SSD Link.

Digital/Output Channel	RG350760 - Handles one Digital Output from SSD Link.

FSM/Input to Event	RG354153 - Converts an input to an Event.  Commonly used with a State Machine or an Annuciator.

FSM/Logic to Event	RG350854 - Converts a logic input to an Event.

FSM/State Machine	RG350855 - Implements an extensible, event-driven, finite state machine.

Function/Linear Fit	RG354225 - Nine point linear fit function.

G Profiler/Generic	RG354112 - General Profile gain block.

G Profiler/Taper Profiler	RG354423 - Taper Profile gain block.

G Profiler/Generic	RG354112 - General Profile gain block.

G Profiler/Taper Profiler	RG354423 - Taper Profile gain block.

Generic Gwy/System Control	RG351276 - System Control block for a Generic Gateway.

L5203 S/Analog Parameter	RG354386 - Interfaces Link values with bisync floats.

L5203 S/Ordinal Parameter	RG354387 - Interfaces Link ordinals with bisync unsigned integers.

L5203 S/Button Helper	RG354397 - For use with external hardware buttons.

L5203 S/Logics Helper	RG354393 - Logic to ordinal conversion block.

L5203 S/Analog Block	RG354383 - Analog Block list for EI Bisync.

L5203 S/Ordinal Block	RG354385 - Ordinal Block list for EI Bisync.

L5203 S/Port ASCII	RG354393 - Port specifier for ASCII EI Bisync.

L5203 S/Port Binary	RG354388 - Port specifier for Binary EI Bisync.

L5203 S/Unused	RG354390 - Place holder for an unused parameter.

L5203 L/Event Logger	RG354402 - Logs an Event to the serial port.

L5203 L/Exception Logger	RG354400 - Logs an Exception to the serial port.

L5203 L/Logic Logger	RG354399 - Logs a Logic input to the serial port.

L5203 L/Ordinal Logger	RG354398 - Logs a Ordinal input to the serial port.

L5203 L/Value Logger	RG354396 - Logs a Value input to the serial port.

L5203 M/Sequencer II	RG354514 - Sequencer for EI Bisync master.

L5203 M/Reader	RG354576 - Reads specified parameter.

L5203 M/Block Reader	RG354579 - Reads specified block.

L5203 M/Value Writer	RG354577 - Writes specified value parameter.

L5203 M/Ordinal Writer	RG354537 - Writes specified ordinal parameter.

L5203 M/Delay	RG354535 - Inserts idle time into sequencer.

Line Drive/Loadcell PID	RG354173 - PID with trim for loadcell.

Line Drive/Master Ramp	RG354616 - S Ramp with Start/Stop logic.

Line Drive/Press Feed	RG354172 - Computes speed setpoint press infeed/outtfeed section.

Line Drive/Section Control	RG354223 - Computes line section speed demand.

Logic Block/Drive Start Logic	RG354289 - Common drive start logic.

For the following Logic Gate blocks; 1,2, 3 & 4 refer to the four inputs from top to bottom in the drawing.

Logic Gate/2A2-O2	RG354210 - [image] Output = (1 & 2) + (3 & 4)

Logic Gate/2O2-A2	RG354217 - [image] Output = (1 + 2) & (3 + 4)

Logic Gate/A2-O2	RG354208 - [image] Output = (1 & 2) + 3

Logic Gate/A2-O2-A2	RG354219 - [image] Output = ((1 & 2) + 3) & 4

Logic Gate/A2-O3	RG354211 - [image] Output = (1 & 2) + 3 + 4

Logic Gate/A3-O2	RG354209 - [image] Output = (1 & 2 & 3) + 4

Logic Gate/AND-2	RG354201 - [image] Two input AND gate.

Logic Gate/AND-3	RG354202 - [image] Three input AND gate.

Logic Gate/AND-4	RG354203 - [image] Four input AND gate.

Logic Gate/Inverter	RG354492 - [image] Output = !Input

Logic Gate/MAJ-3	RG354213 - [image] True if two or more inputs true.

Logic Gate/MUX	RG354214 - 	  Output = (1 & !3) + (2 & 3)

Logic Gate/O2-A2	RG354215 - [image] Output = (1 + 2) & 3

Logic Gate/O2-A2-O2	RG354212 - [image] Output = ((1 + 2) & 3) + 4)

Logic Gate/O2-A3	RG354218 - [image] Output = (1 + 2) & 3 & 4

Logic Gate/O3-A2	RG354216 - [image] Output = (1 + 2 + 3) & 4

Logic Gate/OR-2	RG354204 - [image] Two input OR gate.

Logic Gate/OR-3	RG354205 - [image] Three input OR gate.

Logic Gate/OR-4	RG354206 - [image] Four input OR gate.

Logic Gate/XOR-2	RG354207 - [image] Two input XOR gate.

Logic/Comparator	RG354406 - Compares two inputs.

Logic/Counter	RG354102 - Up/down counter.

Logic/Delay-Off Timer	RG354238 - Delay-off timer.

Logic/Delay-On Timer	RG354233 - Delay-on timer.

Logic/Drive Latch	RG354127 - Latch for use with Health output from drive.

Logic/Equality Comparator	RG350820 - Compares two inputs for equality.

Logic/Fan In Switch, Lgc	RG354430 - Connects on of ten inputs to a single output.

Logic/Fan Out Switch, Lgc	RG354431 - Connects single input to one of ten outputs.

Logic/Hours Counter	RG354175 - Hours counter.

Logic/Latch	RG354403 - Simple latch with toggle input.

Logic/Latch, Persistent	RG354405 - Persistent latch with toggle input.

Logic/Logic Track & Hold	RG354168 - Track and hold block.

Logic/Logics to Ordinal	RG354317 - Converts logic inputs to ordinal output.

Logic/One Shot	RG354156 - Edge selectable one shot.

Logic/Ordinal to Logics	RG354319 - Converts ordinal input to logic outputs.

Logic/Persistent	RG354188 - Persistent logic block.

Logic/System Monitor	RG354264 - System Monitor for exception conditions.

Logic/Underlap	RG354304 - Underlap function.

Logic/Universal Counter	RG354261 - General purpose counter.

Logic/Watchdog	RG354301 - Watchdog block.

Logic/Window Comparator	RG354761 - Compares input to see if within specified low and high limits.

L5210 MB+/Hreg Output	RG354409 - Holding Output register.

L5210 MB+/Coil Input	RG354410 - Coil (logic) Input register.

L5210 MB+/Coil Output	RG354411 - Coil (logic) Output register.

L5210 MB+/Hreg Input	RG354412 - Holding Input register.

L5210 MB+/Float Output	RG354417 - Float Output register.

L5210 MB+/Float Input	RG354418 - Float Input register.

L5210 MB+/System Control	RG354419 - System Control for MB+.

OpStn/Annunciator	RG350765 - Annunciator.

OpStn/Button	RG350766 - Buton.

OpStn/Button Band	RG350763 - List of buttons for one band.

OpStn/Clamped Pot	RG354249 - Clamped Pot.

OpStn/Display Handler	RG354542 - List of Operator Display items.

OpStn/Display Handler SS	RG354515 - List of Operator Display items with screen saver.

OpStn/Meter	RG350840 - Meter.

OpStn/Meter & SP Monitor	RG354424 - Meter and setpoint monitor.

OpStn/Network Monitor	RG354541 - Network error monitor.

OpStn/Ordinal Meter	RG354103 - Ordinal meter.

OpStn/Ordinal Pot	RG354495 - Ordinal pot.

OpStn/Pot	RG350841 - Pot.

OpStn/Pot & Meter	RG350842 - Single band pot and meter combination.

Ordinal/Ordinal Clamp	RG354494 - Clamps ordinal input.

Ordinal/Fan In Switch, Ord	RG354432 - Connects on of ten inputs to a single output.

Ordinal/Fan Out Switch Ord	RG354433 - Connects single input to one of ten outputs.

Ordinal/Switch	RG354269 - Selects one of two ordinal inputs.

Ordinal/Switch Cascader	RG354491 - Used to create larger Fan In/Out switches.

Recipe/Recipe Channel, Lgc	RG354422 - Supports Logic recipes.

Recipe/Recipe Channel, Ord	RG354421 - Supports Ordinal recipes.

Recipe/Recipe Channel, Val	RG354429 - Supports Value recipes.

Recipe/Recipe Handler	RG354428 - Handler to list recipe channels.

Recipe/Recipe Selector	RG354430 - Used to select a recipe.

Sampler/Logic Sampler	RG350856 - Samples Logic input.

Sampler/Ordinal Sampler	RG354158 - Samples Ordinal input.

Sampler/Value Sampler	RG350863 - Samples Value input.

Sender/Logic Sender	RG354108 - Does lazy update of Logic input.

Sender/Ordinal Sender	RG350853 - Does lazy update of Ordinal input.

Sender/Value Sender	RG354109 - Does lazy update of Value input.

SignalP/Adder	RG350857 - Three input adder.

SignalP/Bipolar to Unipolar	RG350858 - Converts bipolar input to unipolar output.

SignalP/Clamp	RG350859 - Clamps input.

SignalP/Decimation Filter	RG354245 - Averaging filter.

SignalP/Disconnect Switch	RG354248 - Disconnect switch.

SignalP/Draw 1	RG354095 - (input 1 - input 2) / input 1.

SignalP/Draw 2	RG354110 - (input 1 - input 2) / input 2.

SignalP/Fan In Switch, Val	RG354428 - Connects on of ten inputs to a single output.

SignalP/Fan Out Switch, Val	RG354429 - Connects single input to one of ten outputs.

SignalP/Filter	RG354242 - single-pole low-pass filter.

SignalP/Linear Ramp	RG354111 - Linear ramp.

SignalP/Maximum	RG354364 - Outputs maximumm of inputs.

SignalP/Minimum	RG354366 - Outputs minimum of inputs.

SignalP/Multiplier	RG350860 - (input  x  multiplier)  /  divisor.

SignalP/Ordinal to Value	RG354245 - Converts ordinal to a value.

SignalP/PID	RG350861 - Performs a PID function.

SignalP/Persistent	RG350868 - Persistent value block.

SignalP/Pushbutton Pot	RG354441 - Similar to OpStn/Pot.

SignalP/Pushbutton Ramp	RG354280 - Ramp with Raise/Lower inputs.

SignalP/S Ramp	RG350862 - Acceleration limiting ramp.

SignalP/Select & Disconnect	RG354456 - Connects single input to one of ten outputs.

SignalP/Sign Changer	RG354160 - Inverts sign of input.

SignalP/Sign and Magnitude	RG354169 - Outputs sign and magnitude of input.

SignalP/Simple Filter	RG354247 - Simple filter.

SignalP/Square Root	RG354232 - Square root.

SignalP/Subtractor	RG350864 - input 1  -  input 2.

SignalP/Suppressor	RG354391 - Filters out illegal Link values.

SignalP/Switch	RG350865 - Selects one of two value inputs.

SignalP/Unipolar to Bipolar	RG350866 - Converts a unipolar input to a bipolar output.

SignalP/Value Track & Hold	RG354129 - Track and hold block.

SignalP/Value to Binary	RG354438 - Converts a value input to binary outputs.

SignalP/Value to Ordinal	RG354260 - Converts a value input to an ordinal output.

Utility/Delay	RG354227 - Delays message in event queue.

Utility/Initializer	RG354255 - Used to initialize other blocks.

Utility/System Control	RG354157 - Provides Network management functions.

Utility/System Control II	RG354312 - Provides Network management functions.

Utility/Time Delay	RG354536 - Delays outputing its input by specified delay time.

VME/Input Handler	RG354267 - Specifies Input Channels.

VME/Input Channel	RG354283 - Input Channel.

VME/Output Handler	RG354266 - Specifies Output Channels.

VME/Output Channel	RG354284 - Output Channel.

Winders/CPW	RG354465 - Current Programmed Winder (open loop).

Winders/SPW	RG354464 - Speed Programmed Winder (closed loop).


Alarms

Alarms/Alarm Channel	RG35402 5 - Single channel of an alarm-handling system.

Alarms/Alarm Handler	RG354026 - Implements an alarm handling system.


Analog

Analog/Analog Input	RG354271 - Analog Input channel for L5201 module.

Analog/Analog Output	RG354272 - Analog Output channel for L5201 module.


DH+ Gateway

DH+ Gateway/Bit Input Register	RG354380 - Bit Input to SSD Link from Data Highway Plus.

DH+ Gateway/Bit Output Register	RG354381 - Bit Output from SSD Link to Data Highway Plus.

DH+ Gateway/Float Input Register	RG354459 - Float Input to SSD Link from Data Highway Plus.

DH+ Gateway/ Float Output Register	RG354460- Float Output from SSD Link to Data Highway Plus.

DH+ Gateway/Integer Input Register	RG354461 - Integer Input to SSD Link from Data Highway Plus.

DH+ Gateway/ Integer Output Register	RG354462 - Integer Output from SSD Link to Data Highway Plus.


Digital

Digital/Digital Handler	RG350758 - Specifies Digital Input/Output Channels for normal digital module (L5202).

Digital/Digital Handler2	RG354138 - Specifies Digital Input/Output Channels for high speed digital module (L5209)..

Digital/Input Channel	RG350759 - Handles one Digital Input to SSD Link.

Digital/Output Channel	RG350760 - Handles one Digital Output from SSD Link.


FSM

FSM/Input to Event	RG354153 - Converts an input to an Event.  Commonly used with a State Machine or an Annuciator.

FSM/Logic to Event	RG350854 - Converts a logic input to an Event.

FSM/State Machine	RG350855 - Implements an extensible, event-driven, finite state machine.


Function

Function/Linear Fit	RG354225 - Nine point linear fit function.


G Profiler

G Profiler/Generic	RG354112 - General Profile gain block.

G Profiler/Taper Profiler	RG354423 - Taper Profile gain block.


Generic Gwy

Generic Gwy/System Control	RG351276 - System Control block for a Generic Gateway.


L5203 S

L5203 S/Analog Parameter	RG354386 - Interfaces Link values with bisync floats.

L5203 S/Ordinal Parameter	RG354387 - Interfaces Link ordinals with bisync unsigned integers.

L5203 S/Button Helper	RG354397 - For use with external hardware buttons.

L5203 S/Logics Helper	RG354393 - Logic to ordinal conversion block.

L5203 S/Analog Block	RG354383 - Analog Block list for EI Bisync.

L5203 S/Ordinal Block	RG354385 - Ordinal Block list for EI Bisync.

L5203 S/Port ASCII	RG354393 - Port specifier for ASCII EI Bisync.

L5203 S/Port Binary	RG354388 - Port specifier for Binary EI Bisync.

L5203 S/Unused	RG354390 - Place holder for an unused parameter.


L5203 L

L5203 L/Event Logger	RG354402 - Logs an Event to the serial port.

L5203 L/Exception Logger	RG354400 - Logs an Exception to the serial port.

L5203 L/Logic Logger	RG354399 - Logs a Logic input to the serial port.

L5203 L/Ordinal Logger	RG354398 - Logs a Ordinal input to the serial port.

L5203 L/Value Logger	RG354396 - Logs a Value input to the serial port.


L5203 M

L5203 M/Sequencer II	RG354514 - Sequencer for EI Bisync master.

L5203 M/Reader	RG354576 - Reads specified parameter.

L5203 M/Block Reader	RG354579 - Reads specified block.

L5203 M/Value Writer	RG354577 - Writes specified value parameter.

L5203 M/Ordinal Writer	RG354537 - Writes specified ordinal parameter.

L5203 M/Delay	RG354535 - Inserts idle time into sequencer.


Line Drive

Line Drive/Loadcell PID	RG354173 - PID with trim for loadcell.

Line Drive/Master Ramp	RG354616 - S Ramp with Start/Stop logic.

Line Drive/Press Feed	RG354172 - Computes speed setpoint press infeed/outtfeed section.

Line Drive/Section Control	RG354223 - Computes line section speed demand.


Logic Block

Logic Block/Drive Start Logic	RG354289 - Common drive start logic.


Logic Gate

For the following Logic Gate blocks; 1,2, 3 & 4 refer to the four inputs from top to bottom in the drawing.

Logic Gate/2A2-O2	RG354210 - [image] Output = (1 & 2) + (3 & 4)

Logic Gate/2O2-A2	RG354217 - [image] Output = (1 + 2) & (3 + 4)

Logic Gate/A2-O2	RG354208 - [image] Output = (1 & 2) + 3

Logic Gate/A2-O2-A2	RG354219 - [image] Output = ((1 & 2) + 3) & 4

Logic Gate/A2-O3	RG354211 - [image] Output = (1 & 2) + 3 + 4

Logic Gate/A3-O2	RG354209 - [image] Output = (1 & 2 & 3) + 4

Logic Gate/AND-2	RG354201 - [image] Two input AND gate.

Logic Gate/AND-3	RG354202 - [image] Three input AND gate.

Logic Gate/AND-4	RG354203 - [image] Four input AND gate.

Logic Gate/Inverter	RG354492 - [image] Output = !Input

Logic Gate/MAJ-3	RG354213 - [image] True if two or more inputs true.

Logic Gate/MUX	RG354214 - 	  Output = (1 & !3) + (2 & 3)

Logic Gate/O2-A2	RG354215 - [image] Output = (1 + 2) & 3

Logic Gate/O2-A2-O2	RG354212 - [image] Output = ((1 + 2) & 3) + 4)

Logic Gate/O2-A3	RG354218 - [image] Output = (1 + 2) & 3 & 4

Logic Gate/O3-A2	RG354216 - [image] Output = (1 + 2 + 3) & 4

Logic Gate/OR-2	RG354204 - [image] Two input OR gate.

Logic Gate/OR-3	RG354205 - [image] Three input OR gate.

Logic Gate/OR-4	RG354206 - [image] Four input OR gate.

Logic Gate/XOR-2	RG354207 - [image] Two input XOR gate.


Logic

Logic/Comparator	RG354406 - Compares two inputs.

Logic/Counter	RG354102 - Up/down counter.

Logic/Delay-Off Timer	RG354238 - Delay-off timer.

Logic/Delay-On Timer	RG354233 - Delay-on timer.

Logic/Drive Latch	RG354127 - Latch for use with Health output from drive.

Logic/Equality Comparator	RG350820 - Compares two inputs for equality.

Logic/Fan In Switch, Lgc	RG354430 - Connects on of ten inputs to a single output.

Logic/Fan Out Switch, Lgc	RG354431 - Connects single input to one of ten outputs.

Logic/Hours Counter	RG354175 - Hours counter.

Logic/Latch	RG354403 - Simple latch with toggle input.

Logic/Latch, Persistent	RG354405 - Persistent latch with toggle input.

Logic/Logic Track & Hold	RG354168 - Track and hold block.

Logic/Logics to Ordinal	RG354317 - Converts logic inputs to ordinal output.

Logic/One Shot	RG354156 - Edge selectable one shot.

Logic/Ordinal to Logics	RG354319 - Converts ordinal input to logic outputs.

Logic/Persistent	RG354188 - Persistent logic block.

Logic/System Monitor	RG354264 - System Monitor for exception conditions.

Logic/Underlap	RG354304 - Underlap function.

Logic/Universal Counter	RG354261 - General purpose counter.

Logic/Watchdog	RG354301 - Watchdog block.

Logic/Window Comparator	RG354761 - Compares input to see if within specified low and high limits.


L5210 MB+

L5210 MB+/Hreg Output	RG354409 - Holding Output register.

L5210 MB+/Coil Input	RG354410 - Coil (logic) Input register.

L5210 MB+/Coil Output	RG354411 - Coil (logic) Output register.

L5210 MB+/Hreg Input	RG354412 - Holding Input register.

L5210 MB+/Float Output	RG354417 - Float Output register.

L5210 MB+/Float Input	RG354418 - Float Input register.

L5210 MB+/System Control	RG354419 - System Control for MB+.


OpStn

OpStn/Annunciator	RG350765 - Annunciator.

OpStn/Button	RG350766 - Buton.

OpStn/Button Band	RG350763 - List of buttons for one band.

OpStn/Clamped Pot	RG354249 - Clamped Pot.

OpStn/Display Handler	RG354542 - List of Operator Display items.

OpStn/Display Handler SS	RG354515 - List of Operator Display items with screen saver.

OpStn/Meter	RG350840 - Meter.

OpStn/Meter & SP Monitor	RG354424 - Meter and setpoint monitor.

OpStn/Network Monitor	RG354541 - Network error monitor.

OpStn/Ordinal Meter	RG354103 - Ordinal meter.

OpStn/Ordinal Pot	RG354495 - Ordinal pot.

OpStn/Pot	RG350841 - Pot.

OpStn/Pot & Meter	RG350842 - Single band pot and meter combination.


Ordinal

Ordinal/Ordinal Clamp	RG354494 - Clamps ordinal input.

Ordinal/Fan In Switch, Ord	RG354432 - Connects on of ten inputs to a single output.

Ordinal/Fan Out Switch Ord	RG354433 - Connects single input to one of ten outputs.

Ordinal/Switch	RG354269 - Selects one of two ordinal inputs.

Ordinal/Switch Cascader	RG354491 - Used to create larger Fan In/Out switches.


Recipe

Recipe/Recipe Channel, Lgc	RG354422 - Supports Logic recipes.

Recipe/Recipe Channel, Ord	RG354421 - Supports Ordinal recipes.

Recipe/Recipe Channel, Val	RG354429 - Supports Value recipes.

Recipe/Recipe Handler	RG354428 - Handler to list recipe channels.

Recipe/Recipe Selector	RG354430 - Used to select a recipe.


Sampler

Sampler/Logic Sampler	RG350856 - Samples Logic input.

Sampler/Ordinal Sampler	RG354158 - Samples Ordinal input.

Sampler/Value Sampler	RG350863 - Samples Value input.


Sender

Sender/Logic Sender	RG354108 - Does lazy update of Logic input.

Sender/Ordinal Sender	RG350853 - Does lazy update of Ordinal input.

Sender/Value Sender	RG354109 - Does lazy update of Value input.


SignalP

SignalP/Adder	RG350857 - Three input adder.

SignalP/Bipolar to Unipolar	RG350858 - Converts bipolar input to unipolar output.

SignalP/Clamp	RG350859 - Clamps input.

SignalP/Decimation Filter	RG354245 - Averaging filter.

SignalP/Disconnect Switch	RG354248 - Disconnect switch.

SignalP/Draw 1	RG354095 - (input 1 - input 2) / input 1.

SignalP/Draw 2	RG354110 - (input 1 - input 2) / input 2.

SignalP/Fan In Switch, Val	RG354428 - Connects on of ten inputs to a single output.

SignalP/Fan Out Switch, Val	RG354429 - Connects single input to one of ten outputs.

SignalP/Filter	RG354242 - single-pole low-pass filter.

SignalP/Linear Ramp	RG354111 - Linear ramp.

SignalP/Maximum	RG354364 - Outputs maximumm of inputs.

SignalP/Minimum	RG354366 - Outputs minimum of inputs.

SignalP/Multiplier	RG350860 - (input  x  multiplier)  /  divisor.

SignalP/Ordinal to Value	RG354245 - Converts ordinal to a value.

SignalP/PID	RG350861 - Performs a PID function.

SignalP/Persistent	RG350868 - Persistent value block.

SignalP/Pushbutton Pot	RG354441 - Similar to OpStn/Pot.

SignalP/Pushbutton Ramp	RG354280 - Ramp with Raise/Lower inputs.

SignalP/S Ramp	RG350862 - Acceleration limiting ramp.

SignalP/Select & Disconnect	RG354456 - Connects single input to one of ten outputs.

SignalP/Sign Changer	RG354160 - Inverts sign of input.

SignalP/Sign and Magnitude	RG354169 - Outputs sign and magnitude of input.

SignalP/Simple Filter	RG354247 - Simple filter.

SignalP/Square Root	RG354232 - Square root.

SignalP/Subtractor	RG350864 - input 1  -  input 2.

SignalP/Suppressor	RG354391 - Filters out illegal Link values.

SignalP/Switch	RG350865 - Selects one of two value inputs.

SignalP/Unipolar to Bipolar	RG350866 - Converts a unipolar input to a bipolar output.

SignalP/Value Track & Hold	RG354129 - Track and hold block.

SignalP/Value to Binary	RG354438 - Converts a value input to binary outputs.

SignalP/Value to Ordinal	RG354260 - Converts a value input to an ordinal output.


Utility

Utility/Delay	RG354227 - Delays message in event queue.

Utility/Initializer	RG354255 - Used to initialize other blocks.

Utility/System Control	RG354157 - Provides Network management functions.

Utility/System Control II	RG354312 - Provides Network management functions.

Utility/Time Delay	RG354536 - Delays outputing its input by specified delay time.


VME

VME/Input Handler	RG354267 - Specifies Input Channels.

VME/Input Channel	RG354283 - Input Channel.

VME/Output Handler	RG354266 - Specifies Output Channels.

VME/Output Channel	RG354284 - Output Channel.


Winders

Winders/CPW	RG354465 - Current Programmed Winder (open loop).

Winders/SPW	RG354464 - Speed Programmed Winder (closed loop).