Copyright: Created with EasyHelp (Tel: 0973 209667)


hat's New in Database Revision 901
What's New in Database Revision 901

The following is a list of major new features and fixes which have been added to revision 901 of the database:

* Added support for the new 690+ AC Drive Technology Box.  Note that this requires version 1.5 or later of the Drive firmware.

*	New software for the L5353 Profibus LinkCard to fix a problem where the card would occasionally fail to reestablish communication after a bus failure or power loss.

* New function blocks for the L5351 DeviceNet LinkCard which include internal senders and internal scaling on the SInt blocks.

* Fixed a problem in the Master Ramp function block which could cause the Ramp Output to increase above the Jog Speed setpoint if the Jog input was repeatedly toggled (depending on the Stop S Rate setting).

* Fixed a problem in the 605/584SV Technology Box which could cause some initial values on Tag Writers to decrement by 1 LSB on each power cycle or restart.

* Changed the Tag Number max limit on discrete Tag Reader and Tag Writer blocks from 999 to 1999.

Database Numbers at time of Release:

Platforms -	14

Libraries -	113

Instructions -	9

Classes -	901

30 October, 2000