Copyright: Created with EasyHelp (Tel: 0973 209667)


What's New in Database Revision 770

The following is a list of major new features and fixes which have been added to revision 770 of the database:

*	New software for the L5353 Profibus LinkCard to enhance compatibility with some masters.

* Added support for the new 590+ DC Drive Technology Box.

* Added support for the new Drive System Designer and AutoConfigure tools.

Database Numbers at time of Release:

Platforms -	14

Libraries -	112

Instructions -	9

Classes -	770

28 April, 2000