Copyright: Made with EasyHelp/Web (www.easyhelp.com)
Citation: Made with the unregisted copy of EasyHelp/Web. Visit www.easyhelp.com for details of this superb WinHelp & HTML authoring tool!


What's New in Database Revision 736

The following is a list of major new features and fixes which have been added to revision 736 of the database:

*	Added support for the new L5353 Profibus LinkCard.

* Fixed a problem on L539x operator stations where pressing the Contrast or Brightness button to exit the screen saver would cause a phantom button press in the upper left corner of the touchscreen.

Database Numbers at time of Release:

Platforms -	14

Libraries -	111

Instructions -	9

Classes -	736