Copyright: Created with EasyHelp (Tel: 0973 209667)


What's New in Database Revision 614

The following is a list of major new features and fixes which have been added to revision 614 of the database:

*	 Increased the number of timers from 102 to 204 in the Link2 libraries.

*  Modified the L590 configuration templates - changed the default minimum field current from 10% to 90%.

*  Added new function blocks for the Link2 Tech Box.  Tag writers can now be configured to automatically update themselves from the host drive.  This will pick up tag value changes made via the drive's operator station.

*  Fixed a problem in the Link2 Tech Box library that could cause an L-error with the diagnostic message "Non-list argument".

Database Numbers at time of Release:

Platforms -	  14

Libraries -	109

Instructions -   9

Classes -	614