Copyright: Created with EasyHelp (Tel: 0973 209667)


What's New in Database Revision 603

The following is a list of major new features and fixes which have been added to revision 603 of the database:

*  Update to a version of the L5331 Digital LinkCard function block (RA354707) which is available only in projects with a class index less than 486.  These projects, or their parent databases, would have been created in 1997.  The software change corrects a problem where input transitions at the LinkCard terminals can be missed if the length of an input pulse is very close to the programmed debounce time.

Database Numbers at time of Release:

Platforms - 14

Libraries - 108

Instructions - 9

Classes - 603