Copyright: Created with EasyHelp (Tel: 0973 209667)


hat's New in Database Revision 516
What's New in Database Revision 517

The following is a list of major new features and fixes which have been added to revision 517 of the database:

*	 Support for the LINK2 Technology Box (used with the 584SV and 605 AC Drives).

* Update to the L5331 Digital LinkCard software to correct a problem where input transitions could be missed if the length of an input pulse was very close to the programmed debounce time.

* Changed the default debounce times on the L5331 to 100 msec.

* Update to the VME Card High Performance software to prevent timeouts (H-errors) during large data transfers from the PLC.