Copyright: Created with EasyHelp (Tel: 0973 209667)


What's New in Database Revision 495

The following is a list of major new features and fixes which have been added to revision 495 of the database:

*	Problem with Multipaging causes Junk In Eval msg. Corrected.

*	L5331 Digital I/O changed to provide more accurate counter operation.

*	In Help, selecting LinkCard/L5331 Digital gave you the L5341 Analog datasheet. Corrected.