Copyright: Created with EasyHelp (Tel: 0973 209667)


What's New in DSD version 1.07

The following is a list of major new features and fixes which have been added to DSD 1.07 which did not exist in DSD 1.06:

* Corrected a problem which could cause DSD to crash when making connections to the Trips History block in the 690+ Link Technology Box.

* Corrected a problem where DSD would abort an installation with the message 'illegal persistent index' when trying to install a configuration with recipe channels and handlers.

* Corrected problem which caused DSD to crash when opening a module list window that contained only 2 lines.

* DSD now saves all open configurations that are updated when closing a configuration that references one of the open configurations.

* Corrected a problem where DSD would abort an installation with the message 'error in handler #3' when trying to install a configuration with connections from a split external macro.

* Corrected a problem where project data was not included in the form of a macro when doing a Print Project.

* Corrected a problem which could cause DSD to crash when moving connectors which have very long names.

* Corrected a problem where DSD would duplicate connections between macros during a Project Update (AutoConfigured projects only).

* Corrected problem in Get Info for Link1 modules. Data values for 'Messages/s:', 'Address matches:', and 'Frag, CRC, OVR:' were displayed (with erroneous values), but have now been removed since these items are not available for Link1.

Database Numbers at time of Release:

Platforms -	14

Libraries -	113

Instructions - 	9

Classes - 	901

20 December, 2000