Copyright: Created with EasyHelp (Tel: 0973 209667)


hat's New in DSD version 1.06
What's New in DSD version 1.06

The following is a list of major new features which have been added to DSD 1.06 which did not exist in DSD 1.02:

* Support for the 690+ AC Drive Technology Box.

* Fixed a problem in SAM which could cause DSD to crash when reading or monitoring data in a 590+ Technology Box.

Database Numbers at time of Release:

Platforms -	14

Libraries -	113

Instructions - 	9

Classes - 	901

1 November, 2000