Copyright: Created with EasyHelp (Tel: 0973 209667)


What's New in ConfigEd version 4.02

Version 4.02 of ConfigEd corrects a problem in version 4.01 that caused MiniLink confugurations to not be installed properly.  Since MiniLink configurations are not generally installed in the field, this should not be of concern to most ConfigEd users.

Version 4.02 now allows 'SAM' users to add and delete function blocks and connections in existing configurations.  'SAM' users still cannot create new configurations or projects.  Use care to make sure that you do not make unwanted changes to existing Configurations!!!