Copyright: Created with EasyHelp (Tel: 0973 209667)


eneral
General

If you need help and cannot find the information in either the ConfigEd manual or this on-line help, please contact Eurotherm Drives Customer Service Department at (704) 588-3246 or fax (704) 588-3249.

WARNING!!

Duplication and use on multiple computers will cause unrecoverable

 data-corruption for which Eurotherm Drives Inc. will not be held liable.

Please make sure to refer to the Help menu for additional items such as product bulletins which may appear when you update your database.  You should call the Manager regularly to get updates to both the software, data and help files.

To get help on particular function blocks, please refer to Data Sheets in the Help menu or hold down the shift key and double click on the function block in the configuration.  You can also get help on a function block by holding down the shift key when selecting it from the Block menu.