Copyright: Made with EasyHelp/Web (www.easyhelp.com)


Manager 4.14, DSD 1.16 & Link Database Update  - CD ROM version
DSD 1.19 & Link Database Update  - CD ROM version

Associated Database Revisions:

Library revision:       130-0

Class revision:        1237-0

This CD ROM version was released on 29 April 2004

Please read the following carefully. You can not copy the files to the "c"  hard drive and them install them to the "c" hard drive. The 'source' hard drive must be different than the 'install' hard drive. Thus there are 2 ways to update the Link database:

Updating the Link database via a CD ROM:

This update will update the Link database, DSD  &  Manager

1.	Download the 14 meg file: "dsd.zip"

2.	Unzip the file dsd.zip and copy the 10 files to a CD ROM.

3.	Run the CD ROM to install the updates.

Updating the Link database via computer hard drive:

This update will update the Link database and DSD. You must already have Manager installed to update from the hard drive.

1.	Download the 14 meg file: "dsd.zip"

2.	Unzip the file dsd.zip to a folder.

4.	Launch MANAGER.

5.	Go to DATABASE, select IMPORT.

6.	Locate the file 'database.001"

7.	Click on OPEN to import the database.

For questions, contact: Eurotherm Drives - USA

Product Support Group, Monday - Friday / 8AM-5Pm EST

at 704-588-3246.