Copyright: Made with EasyHelp/Web (www.easyhelp.com)


Link Database Update - CD ROM version
Manager 4.14, ConfigEd 5.18 & Link Database Update  - CD ROM version

Associated Database Revisions:

Library revision:       130-0

Class revision:        1237-0

Manager 4.14 and this CD ROM version were created on 29 April 2004

These files will update an existing Link account to the latest version of the Link Database and ConfigEd. This update does not include DSD. You MUST have an existing Link account for these files to install.

If you are Updating a DSD account with this database, you MUST also update DSD to DSD 1.16 or greater. If the DSD account does not have DSD 1.16 or greater, any configuration containing Macros like the 590+ or 690+, will not open. DSD is NOT included in this database.

Please read the following carefully. You can not copy the files to the "c"  hard drive and them install them to the "c" hard drive. The 'source' hard drive must be different than the 'install' hard drive. Thus there are 2 ways to update the Link database:

Updating the Link database via a CD ROM:

This update will update the Link database, ConfigEd &  Manager

1.	Download the 14 meg file: "database.zip"

2.	Unzip the file database.zip and copy the 10 files to a CD ROM.

3.	Run the CD ROM to install the updates.

Updating the Link database via computer hard drive:

This update will update the Link database and ConfigEd. You must already have Manager installed to update from the hard drive.

1.	Download the 14 meg file: "database.zip"

2.	Unzip the file database.zip to a folder.

4.	Launch MANAGER.

5.	Go to DATABASE, select IMPORT.

6.	Locate the file 'database.001"

7.	Click on OPEN to import the database.

For questions, contact: Eurotherm Drives - USA

Product Support Group, Monday - Friday / 8AM-5Pm EST

at 704-588-3246.